<script setup>
function handleClickLeft() {
  uni.reLaunch({
    url: '/pages/index',
  })
}
</script>

<template>
  <view class="min-h-full from-lightblue-200/40 to-white bg-gradient-to-b">
    <wd-navbar
      title=""
      left-arrow
      safe-area-inset-top
      custom-style="background-color: transparent !important;"
      @click-left="handleClickLeft"
    />
    <slot />
  </view>
</template>

<style scoped>

</style>
