SET NAMES utf8mb4;

SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for main
-- ----------------------------
DROP TABLE IF EXISTS `user`;

CREATE TABLE `user` (
    `id` bigint NOT NULL AUTO_INCREMENT,
    `create_time` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP,
    `update_time` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
    `delete_time` datetime DEFAULT NULL COMMENT '删除时间',
    `del_state` tinyint NOT NULL DEFAULT '0',
    `version` bigint NOT NULL DEFAULT '0' COMMENT '版本号',
    `mobile` char(11) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '',
    `password` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT NULL,
    `nickname` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '',
    `info` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '',
    `inside` tinyint NOT NULL DEFAULT '0',
    PRIMARY KEY (`id`),
    UNIQUE KEY `unique_mobile` (`mobile`)
) ENGINE = InnoDB DEFAULT CHARSET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '用户表';

-- ----------------------------
-- Table structure for user_auth
-- ----------------------------
DROP TABLE IF EXISTS `user_auth`;

CREATE TABLE `user_auth` (
    `id` bigint NOT NULL AUTO_INCREMENT,
    `create_time` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP,
    `update_time` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
    `delete_time` datetime DEFAULT NULL COMMENT '删除时间',
    `del_state` tinyint NOT NULL DEFAULT '0',
    `version` bigint NOT NULL DEFAULT '0' COMMENT '版本号',
    `user_id` bigint NOT NULL DEFAULT '0',
    `auth_key` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '' COMMENT '平台唯一id',
    `auth_type` varchar(12) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '' COMMENT '平台类型',
    PRIMARY KEY (`id`),
    UNIQUE KEY `unique_type_key` (`auth_type`, `auth_key`) USING BTREE,
    UNIQUE KEY `unique_userId_key` (`user_id`, `auth_type`)
) ENGINE = InnoDB DEFAULT CHARSET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '用户授权表';

SET FOREIGN_KEY_CHECKS = 1;

-- 临时用户表(user_temp)
CREATE TABLE `user_temp` (
    `id` bigint NOT NULL AUTO_INCREMENT,
    `auth_key` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '' COMMENT '平台唯一id',
    `auth_type` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '' COMMENT '平台类型',
    `create_time` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP,
    `update_time` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP ON UPDATE CURRENT_TIMESTAMP,
    `delete_time` datetime DEFAULT NULL COMMENT '删除时间',
    `del_state` tinyint NOT NULL DEFAULT '0',
    `version` bigint NOT NULL DEFAULT '0' COMMENT '版本号',
    PRIMARY KEY (`id`),
    UNIQUE KEY `unique_type_key` (`auth_type`, `auth_key`) USING BTREE
) ENGINE = InnoDB DEFAULT CHARSET = utf8mb4 COMMENT = '临时用户表';